      links: 1374
      nodes: 180
     layers: 10
bottlenecks: 55
  remaining: 155

 1: 1.00000
 2: 0.50000
 3: 0.20000
 4: 0.16667
 5: 0.14286
 6: 0.11111
 7: 0.10714
 8: 0.10000
 9: 0.09524
10: 0.08571